\HeaderA{chart.Scatter}{wrapper to draw scatter plot with sensible defaults}{chart.Scatter}
\keyword{ts}{chart.Scatter}
\keyword{multivariate}{chart.Scatter}
\keyword{distribution}{chart.Scatter}
\keyword{models}{chart.Scatter}
\keyword{hplot}{chart.Scatter}
\begin{Description}\relax
Draws a scatter chart.  This is another chart "primitive", since it only contains a set of sensible defaults.
\end{Description}
\begin{Usage}
\begin{verbatim}
chart.Scatter(x, y, reference.grid = TRUE, main = "Title", ylab = NULL, xlab = NULL, xlim = NA, ylim = NA, colorset = 1, symbolset = 1, element.color = "darkgray", cex.axis = 0.8, cex.legend = 0.8, cex.lab = 1, cex.main = 1, ...)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{x}] data for the x axis, can take matrix,vector, or timeseries 
\item[\code{y}] data for the y axis, can take matrix,vector, or timeseries 
\item[\code{reference.grid}] if true, draws a grid aligned with the points on the x and y axes 
\item[\code{main}] set the chart title, same as in \code{plot} 
\item[\code{ylab}] set the y-axis label, as in \code{\LinkA{plot}{plot}} 
\item[\code{xlab}] set the x-axis label, as in \code{\LinkA{plot}{plot}} 
\item[\code{xlim}] set the x-axis limit, same as in \code{\LinkA{plot}{plot}} 
\item[\code{ylim}] set the y-axis limit, same as in \code{\LinkA{plot}{plot}} 
\item[\code{colorset}] color palette to use, set by default to rational choices 
\item[\code{symbolset}] from \code{pch} in \code{\LinkA{plot}{plot}},  submit a set of symbols to be used in the same order as the data sets submitted 
\item[\code{element.color}] provides the color for drawing chart elements, such as the box lines, axis lines, etc. Default is "darkgray" 
\item[\code{cex.lab}] The magnification to be used for x- and y-axis labels relative to the current setting of 'cex'
\item[\code{cex.axis}] The magnification to be used for axis annotation relative to the current setting of 'cex', same as in \code{\LinkA{plot}{plot}}.  
\item[\code{cex.main}] The magnification to be used for the main title relative to the current setting of 'cex'.  
\item[\code{cex.legend}] The magnification to be used for sizing the legend relative to the current setting of 'cex'.  
\item[\code{...}] any other passthru parameters 
\end{ldescription}
\end{Arguments}
\begin{Value}
Draws a graph of type "scatter" with some sensible defaults.
\end{Value}
\begin{Note}\relax
Most inputs are the same as "\code{\LinkA{plot}{plot}}" and are principally included so that some sensible defaults could be set.
\end{Note}
\begin{Author}\relax
Peter Carl
\end{Author}
\begin{SeeAlso}\relax
\code{\LinkA{plot}{plot}}
\end{SeeAlso}
\begin{Examples}
\begin{ExampleCode}
data(edhec)
chart.Scatter(edhec[,1],edhec[,2])
\end{ExampleCode}
\end{Examples}

